-10 0 10 σ_{1/2}−σ_{3/2} ΜμbΝ

-10 0 10

-10 0 10

-10 0 10

-10 0 10

10 10^2

5 10 50 100 ν ΜGeVΝ

Q^2 = 0.8 - 1.8 GeV^2

1.8 - 2.8 GeV^2

2.8 - 4 GeV^2

4 - 6 GeV^2

6 - 10 GeV^2