) [GeV]

-π^+π M( 0.4 0.45 0.5 0.55

Events/(2MeV)

100 200 300 400 500 600 700 0.10 MeV ± =497.49

new_0 SKM 0.09 MeV ± =5.24

new_0 SKσ 0.2 MeV ± =496.8

old_0 SKM 0.2 MeV ± =6.2

old_0 SKσ