0 50 100 150 200

4 6 W [GeV]

Events/0.08GeV

0 100 200 300

0 2.5 5 Q^2 [GeV^2]

Events/0.14GeV^2

0

100

200

0 0.2 0.4 0.6 -t^/ [GeV^2]

Events/0.012GeV^2

0 50 100 150 200

0 10 P_{π+} [GeV]

Events/0.30GeV