Im r^3_{1-1} r^1_1 r^{04}_{1-1} r^8_{1-1} r^8_{11}

Im r^7_{1-1}

Im r^6_{1-1} r^5_{1-1} r^5_{11} r^8_{00}

Im r^3_{10} r^1_{00} r^5_{00}

Im r^2_{10}

Re r^1_0

Re r^{04}_{10}

Re r^8_{10}

Im r^7_{10}

Im r^6_{10}

Re r^5_{10}

Im r^2_{1-1} r^1_{-1} r^{04}_{00}

-0.5 -0.4 -0.3 -0.2 -0.1 0 0.1 0.2 0.3 0.4 0.5 0.6 SDME values ω, deuteron ω, proton

ρ^0, proton ρ^0, deuteron

A: γ^*_L →VM_L

γ^*_T →VM_T

B: Interference γ^*_L →VM_L & γ^*_T →VM_T

C: γ^*_T →VM_L

D: γ^*_L →VM_T

E: γ^*_T →VM_{-T}