-40 -20 0 20 40 60

-1400 -1200 -1000 -800 -600 -400 -200 0 z (mm) r (mm)

SFT MFT SFT / WFT

cell discharge tube

nozzle coll.

1st sexp. magn. syst. 2nd sexp. magn. syst.

injection tube