0 0.1 0.2 0.3 0.4 0.5

1 10 10^2 B (mT) n_i

P_e injected

n_1 n_2 n_3 n_4 0 0.1 0.2 0.3 0.4 0.5

1 10 10^2 B (mT) n_i

P_{z+} injected

0 0.1 0.2 0.3 0.4 0.5

1 10 10^2 B (mT) n_i

P_{z-} injected