10^{-1}

1

10

10^{-2} 10^{-1} 1

Q^2 (GeV^2)

Q^2 = 0.18 GeV^2 y = 0.91 y = 0.1 θ = 0.04 rad θ = 0.22 rad

W^2 = 3.24 GeV^2

Q^2 = 1 GeV^2

A B C

x y

Q^2 = 0.18 GeV^2 y = 0.91

y = 0.1 θ = 0.04 rad θ = 0.22 rad

W^2 = 3.24 GeV^2

Q^2 = 1 GeV^2

0.09 0.1

0.2

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

10^{-2} 10^{-1} 1