10^{-1}

10^0

<W> = 4.6 GeV

0 1 2 3 4 5

10^{-1}

10^0

Q^2 [GeV^2] σ(γ*pρ0p) [μb]

<W> = 5.4 GeV

(σ_0,ξ^2) - fit (σ_0,m) - fit m - fit