x

ΛP_1(cosθ)Γ

predicted at m_{ππ} = 0.50 GeV for H_2 H_2 at Λ m_{ππ} Γ = 0.48 GeV D_2 at Λ m_{ππ} Γ = 0.48 GeV

H_2 D_2 -0.6

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3

0 0.05 0.1 0.15 0.2 0.25 0.3