-0.6

-0.4

-0.2 0 0.2 0.4 0.6

-1 0 1 2 3 4 5 6 7 λ_{Beam} = +1 λ_{Beam} = -1 Average

M_x (GeV)

A_{LU}^{sinϕ±}

e^{→+}p 5 e^+γ X