overall

LU,I ϕ sin A

-0.6

-0.4

-0.2 0 0.2

]^2

-t [GeV -2 10^{-1}10

-0.6

-0.4

-0.2

0

0.2 HERMES

Bx -1 10 -0.6

-0.4

-0.2

0

0.2 VGG Regge

]^2

[GeV 2Q 1 10

-0.6

-0.4

-0.2

0 γ + p + ^± e→ + p ^±e