[GeV]

T(beam) p 1 1.2 1.4 1.6 1.8 2

A

-0.04

-0.02

0

0.02

0.04

0.06

0.08

/ndf = 12.7/3 2χ MC (1 par. fct.), /ndf = 8.0/2 2χ MC (2 par. fct.),

Hermes

X^± h →ed