0.6 0.8 1 1.2

0.5 1

ΛxΓ = 0.0125

σ_N/σ_D

0.6 0.8 1 1.2

0.5 1

ΛxΓ = 0.0175

0.6 0.8 1 1.2

0.5 1

ΛxΓ = 0.025

0.6 0.8 1 1.2

0.5 1

ΛxΓ = 0.035

0.6 0.8 1 1.2

0.5 1

ΛxΓ = 0.045

0.6 0.8 1 1.2

0.5 1

ΛxΓ = 0.055

0.6 0.8 1 1.2

0.5 1

ΛxΓ = 0.07

0.6 0.8 1 1.2

0.5 1

ΛxΓ = 0.09

0.6 0.8 1 1.2

0.5 1

ΛxΓ = 0.125

0.6 0.8 1 1.2

0.5 1

ΛxΓ = 0.175

0.6 0.8 1 1.2

0.5 1

ΛxΓ = 0.25

0.6 0.8 1 1.2

0.5 1

ΛxΓ = 0.35

ε