-0.2

-0.1

0

0.1

0.2

10^{-1}

0.03 0.1 0.6 x

x(Δu^–-Δd^–) Q^2 = 2.5 GeV^2

χQSM

B. Dressler et al., EPJ C14 (2000) 147.