98 98.25

98.5

98.75 99 99.25

99.5

99.75 100

10^{-1}

98.5 99 99.5 100

Eff. Μ%Ν

0 0.1 0.2 0.3 0.4 0.5 0.6

10^{-1}

x

Cont. Μ%Ν

0.03 0.1 0.6 0 0.1 0.2 0.3 0.4 0.5 0.6 Proton data Deuteron data