BRP ABS

TGA

1st sexp. magn. syst.

collimator discharge tube

SFT MFT 2nd sexp. magn. syst.

SFT / WFT QMS chopper

storage cell

HERA beam sample tube extension tube beam shutter SFT MFT

QMS chopper sexp. magn. syst.

beam blocker nozzle

injection tube