0

0.2

10^{-1} x⋅Δu

-0.2

0

10^{-1} x⋅Δd

-0.1

0

10^{-1}

GRSV 2000 LO val

BB 01 LO x⋅Δu^–

Q^2=2.5GeV^2

-0.1

0

10^{-1} x⋅Δd^–

-0.1

0

10^{-1} x⋅Δs

0.03 0.1 0.6 x