1 1.2 1.4 1.6 1.8 2 2.2 2.4

10^{-1}

x

Uncertainty Inflation

0.03 0.1 0.4

Inclusive

1 1.2 1.4 1.6 1.8 2 2.2 2.4

10^{-1}

x 0.03 0.1 0.4

π^+ Detector effects QED rad. effects Combined effects