-0.4

-0.2 0 0.2 0.4

0 1

-0.4

-0.2 0 0.2 0.4

0 2

-0.4

-0.2 0 0.2 0.4

0 0.1

-0.4

-0.2 0 0.2 0.4

0 0.2

-0.4

-0.2 0 0.2 0.4

0 1

-0.4

-0.2 0 0.2 0.4

0 2 -0.4

-0.2 0 0.2 0.4

0 0.1

A_{UT}^{LL, sin} ^{(ϕ-ϕs} ^)

e p^⇑ e′ ρ^0_L p

overall

A_{UT}^{TT, sin} ^{(ϕ-ϕs} ^)

Q^2 ΜGeV^2Ν x_B

e p^⇑ e′ ρ^0_T p

-t′ ΜGeV^2Ν

-0.4

-0.2 0 0.2 0.4

0 0.2