0.6

0.8

1

1.2

10 20

0.6

0.8

1

1.2

0.8 0.9 1 2 3 4 5 6 7 8 9 10

0.6

0.8

1

1.2

10-2 10-1 1

0.6

0.8

1

1.2

10 20

0.6

0.8

1

1.2

0.8 0.9 1 2 3 4 5 6 7 8 9 10

0.6

0.8

1

1.2

10-2 10-1 1

0.4

0.6

0.8

1

10 20

0.4

0.6

0.8

1

0.8 0.9 1 2 3 4 5 6 7 8 9 10

0.5

0.75

1

1.25

1.5

10-2 10-1 1

0.4

0.6

0.8

1

10 20

0.4

0.6

0.8

1

0.8 0.9 1 2 3 4 5 6 7 8 9 10

1.0 0.8

R_A^π

z Γ 0.7 0.4 Λ z Λ 0.7 0.2 Λ z Λ 0.4

He 1.0 0.8

1.0 0.8 Ne 1.0 0.8

0.6

1.0 0.8 Kr

0.5 1.0

0.6

1.0

0.4

0.8

10 20 ν (GeV)

1 10 Q^2 (GeV^2)

0.1 1 p_t^2 (GeV^2)

Xe

0.5 1.0 0.5

0.75

1

1.25

1.5

10-2 10-1 1