0

0.5

10 15 20

0

0.5

1

0.2 0.4 0.6 0.8 1

0

0.5

1

10 15 20

0

0.5

1

0.2 0.4 0.6 0.8 1

0

0.5

1

10 15 20

0

0.5

1

0.2 0.4 0.6 0.8 1

0

0.5

1

10 15 20

0

0.5

1

0.2 0.4 0.6 0.8 1

0

1

10 15 20

0

1

0.2 0.4 0.6 0.8 1

0.5

1

10 15 20

0.4 0.8 α π^+

0.4 0.8 π^-

0.4 0.8 K+

0.4 0.8 K-

1.0 0 p 1.0 0.5 15 10 20

p−

ν (GeV)

0.2 0.4 0.6 0.8 1 z

0.5

1

0.2 0.4 0.6 0.8 1