92 94 96 98 100

10^{-2} 10^{-1} lepton id. efficiencyΜΨΝ x hadron contaminationΜΨΝ

A B C D E F

0 0.5 1 1.5 2 2.5 3 3.5

10^{-2} 10^{-1}