0.86

0.88 0.9 0.92

0.94

0.96

0.98 1 1.02

10^{-2} 10^{-1}

0.86

0.88 0.9 0.92

0.94

0.96

0.98 1 1.02

10^{-2} 10^{-1}

trigger efficiency

Top Detector

x trigger efficiency

Bottom Detector A B C D E F