0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8

3.5 4 4.5 5 5.5 6 6.5 7

r_G ΜfmΝ

hydrogen data, MEM hydrogen data, MUS

0 0.1 0.2 0.3 0.4 0.5

3.5 4 4.5 5 5.5 6 6.5 7

W ΜGeVΝ

λ