-0.2

0

0.2

-0.15 -0.1 -0.05 0 0.05 0.1 0.15

-0.2 0 0.2

A_{UT}^{sin(ϕ-ϕs)}

-0.2

0

0.2

0 0.5

8.1% scale uncertainty

-0.2

0

0.2

0 0.2

-0.2

0

0.2

0 5 10

J_u=0 0.4 0.2 A_{UT, I}

-0.4

-0.2

0

0.2

0.4

-0.15 -0.1 -0.05 0 0.05 0.1 0.15

-0.4

-0.2 0 0.2

overall

A_{UT}^{sin(ϕ-ϕs)cosϕ}

-0.4

-0.2

0

0.2

0.4

0 0.5

0 0.2 0.4 0.6

-t (GeV^2)

-0.4

-0.2

0

0.2

0.4

0 0.2

0 0.1 0.2 0.3

x_B

-0.4

-0.2

0

0.2

0.4

0 5 10

0 2 4 6 8 10

Q^2 (GeV^2)