ϕ sin LUA

-0.5 0 0.5

)ϕ sin(2 LUA

-0.5 0 0.5

+Δ 0πpγ^+ e→p ^+e

overall

-1 10 1

-0.5

0

0.5

-1 10 1

-0.5

0

0.5

]^2

-t [GeV -1 10 1

Bjx -1 10

-0.5

0

0.5

-1 10

-0.5

0

0.5

Bx -1 10

)^2

(GeV 2Q 1 10

-0.5

0

0.5 scale uncertainty 1.96%

1 10

-0.5

0

0.5

]^2

[GeV 2Q 1 10