Figure 3.11: The ratio of the P_T of the hadronic final state system to the P_T of the scattered electron (top) and the ratio of y measured using the hadrons-only method to the y measured using the double-angle method; both quantities are plotted as a function of the hadronic polar angle, γ_h. The data are shown as points, the sum of the RAPGAP and total background simulations is shown as the solid blue histogram.

and the total background simulations is very good and an uncertainty of 2% on the hadronic calibration is obtained.