< 5 GeV) da T (P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

10

20

30

40

50

Inclusive_DjangoYBal_ptda_le5

Entries 218 Mean 0.7879 RMS 0.2666

T 0 < 10 GeV) da T (5 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 200 400 600 800 1000

1200

1400

1600

Inclusive_DjangoYBal_ptda5_10 Entries 4319 Mean 0.9521 RMS 0.1805 / ndf

2χ 2.472 / 4 Constant 46.66±

1542 Mean 0.005959 ± 0.989 Sigma 0.008607 ± 0.1271

T 0

< 15 GeV) da T (10 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

1000

2000

3000

4000

5000

Inclusive_DjangoYBal_ptda10_15 Entries 20057 Mean 0.9613 RMS 0.2174 / ndf

2χ 9.423 / 6 Constant 65.28±

5129 Mean 0.002136 ± 0.9913 Sigma 0.00287 ± 0.1383

T 0 < 20 GeV) da T (15 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 500 1000

1500

2000

2500

3000

3500

Inclusive_DjangoYBal_ptda15_20 Entries 23365 Mean 0.919 RMS 0.2311 / ndf

2χ 22.48 / 6 Constant 42.46±

3542 Mean 0.001836 ± 0.9836 Sigma 0.002756 ± 0.1407

T 0

< 25 GeV) da T (20 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 200 400 600 800 1000

1200

1400

Inclusive_DjangoYBal_ptda20_25 Entries 11758 Mean 0.925 RMS 0.2003 / ndf

2χ 13.07 / 5 Constant 22.38±

1325 Mean 0.002335 ± 0.9871 Sigma 0.003427 ± 0.1239

T 0 < 20 GeV) da T (25 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 100 200 300 400 500 600 Inclusive_DjangoYBal_ptda25_30 Entries 4921 Mean 0.9397 RMS 0.1704 / ndf

2χ 3.785 / 4 Constant 15.08±

567.4 Mean 0.003682 ± 0.9845 Sigma 0.006316 ± 0.1214

T 0

< 40 GeV) da T (30 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

100

200

300

400

500 Inclusive_DjangoYBal_ptda30_40 Entries 3618 Mean 0.9474 RMS 0.1487 / ndf

2χ 0.4571 / 3 Constant 14.74±

470.6 Mean 0.003855 ± 0.9818 Sigma 0.005827 ± 0.09974

T 0 > 40 GeV) da T (P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

50 100

150 200

250

300 Inclusive_DjangoYBal_ptda_gr40 Entries 1874 Mean 0.9611 RMS 0.1361 / ndf

2χ 0.758 / 3 Constant 11.4±

281.5 Mean 0.00335 ± 0.9927 Sigma 0.004424 ± 0.08275

T 0