< 5 GeV) da T (P_{eT} P h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 10 20 30 40 50 60

Inclusive_DjangoPtBal_ptda_le5

Entries 220 Mean 0.4029 RMS 0.3009

T P h 0 < 10 GeV) da T (5 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 200 400 600 800 1000

1200

Inclusive_DjangoPtBal_ptda5_10 Entries 4319 Mean 0.9617 RMS 0.2373 / ndf

2χ 1.189 / 7 Constant 31.51±

1114 Mean 0.01223 ± 0.9801 Sigma 0.01717 ± 0.2084

T e h 0

< 15 GeV) da T (10 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

500 1000

1500

2000

2500

3000

3500

4000

4500

Inclusive_DjangoPtBal_ptda10_15 Entries 20057 Mean 1 RMS 0.2487 / ndf

2χ 14.21 / 7 Constant 54.24±

4344 Mean 0.004212 ± 1.006 Sigma 0.004855 ± 0.1751

T e h < 20 GeV) da T (15 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

500 1000

1500

2000

2500

3000

3500

Inclusive_DjangoPtBal_ptda15_20 Entries 23365 Mean 0.9496 RMS 0.2502 / ndf

2χ 13.36 / 7 Constant 38.92±

3330 Mean 0.002061 ± 1.004 Sigma 0.00253 ± 0.1451

T e h

< 25 GeV) da T (20 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 200 400 600 800 1000

1200

Inclusive_DjangoPtBal_ptda20_25 Entries 11758 Mean 0.9533 RMS 0.2124 / ndf

2χ 18.2 / 6 Constant 20.27±

1241 Mean 0.002587 ± 1 Sigma 0.003556 ± 0.1368

T e h 0 < 20 GeV) da T (25 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

100

200

300

400

500

Inclusive_DjangoPtBal_ptda25_30 Entries 4921 Mean 0.9736 RMS 0.1823 / ndf

2χ 0.473 / 4 Constant 14.42±

534.2 Mean 0.004294 ± 1.004 Sigma 0.007155 ± 0.1257

T e h 0

< 40 GeV) da T (30 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 50 100 150 200 250 300 350 400 450 Inclusive_DjangoPtBal_ptda30_40 Entries 3618 Mean 0.9785 RMS 0.1578 / ndf

2χ 3.681 / 4 Constant 12.85±

441.6 Mean 0.004105 ± 0.9967 Sigma 0.005579 ± 0.1119

T e h 0 > 40 GeV) da T (P_{eT} P h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

50

100

150

200

250

Inclusive_DjangoPtBal_ptda_gr40 Entries 1874 Mean 0.9843 RMS 0.1402 / ndf

2χ 0.3958 / 2 Constant 12.01±

269.9 Mean 0.004112 ± 1.009 Sigma 0.00619 ± 0.08007

T P h 0