< 5 GeV) da T (P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 5 10 15 20 25 30 35 40 45 Inclusive_DjangoHadPtHadPtDa_ptda_le5

Entries 220 Mean 1.029 RMS 0.3355

T h 0 5

< 10 GeV) da T (5 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

200 400 600 800 1000

1200

1400

Inclusive_DjangoHadPtHadPtDa_ptda5_10

Entries 4319 Mean 0.9963 RMS 0.2575 / ndf

2χ 10.88 / 7 Constant 36.63±

1347 Mean 0.007979 ± 0.9815 Sigma 0.006639 ± 0.1417

T h

< 15 GeV) da T (10 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

1000

2000

3000

4000

5000

Inclusive_DjangoHadPtHadPtDa_ptda10_15

Entries 20057 Mean 0.9557 RMS 0.2266 / ndf

2χ 11.47 / 6 Constant 63.91±

4974 Mean 0.002257 ± 0.989 Sigma 0.003028 ± 0.1403

T h < 20 GeV) da T (15 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

500 1000

1500

2000

2500

3000

3500

Inclusive_DjangoHadPtHadPtDa_ptda15_20

Entries 23365 Mean 0.91 RMS 0.2389 / ndf

2χ 27.42 / 6 Constant 41.42±

3425 Mean 0.001916 ± 0.9812 Sigma 0.002922 ± 0.1433

T h

< 25 GeV) da T (20 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 200 400 600 800 1000

1200

1400

Inclusive_DjangoHadPtHadPtDa_ptda20_25

Entries 11758 Mean 0.913 RMS 0.2101 / ndf

2χ 30.98 / 6 Constant 20.41±

1241 Mean 0.002403 ± 0.9787 Sigma 0.003602 ± 0.1379

T h 0 < 20 GeV) da T (25 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

100

200

300

400

500

Inclusive_DjangoHadPtHadPtDa_ptda25_30

Entries 4921 Mean 0.9269 RMS 0.1838 / ndf

2χ 3.527 / 4 Constant 14.47±

531.1 Mean 0.004172 ± 0.9831 Sigma 0.00757 ± 0.1285

T h 0

< 40 GeV) da T (30 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 50 100 150 200 250 300 350 400 450 Inclusive_DjangoHadPtHadPtDa_ptda30_40

Entries 3618 Mean 0.9307 RMS 0.1677 / ndf

2χ 2.285 / 4 Constant 13.06±

429.6 Mean 0.003724 ± 0.9771 Sigma 0.005955 ± 0.1117

T h 0 > 40 GeV) da T (P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

50

100

150

200

250

Inclusive_DjangoHadPtHadPtDa_ptda_gr40

Entries 1874 Mean 0.9178 RMS 0.1966 / ndf

2χ 14.62 / 5 Constant 9.025±

225.4 Mean 0.004304 ± 0.9838 Sigma 0.005915 ± 0.1094

T h 0