< 5 GeV) da T (P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 10 20 30 40 50 60

Inclusive_DataYBal_ptda_le5

Entries 720 Mean 0.8484 RMS 0.2727

T 0 < 10 GeV) da T (5 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 200 400 600 800 1000

1200

1400

1600

Inclusive_DataYBal_ptda5_10 Entries 15027 Mean 0.926 RMS 0.1843 / ndf

2χ 1.673 / 4 Constant 22.56±

1486 Mean 0.003104 ± 0.9591 Sigma 0.005419 ± 0.1392

T 0

< 15 GeV) da T (10 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

1000

2000

3000

4000

5000

Inclusive_DataYBal_ptda10_15 Entries 53379 Mean 0.9358 RMS 0.2133 / ndf

2χ 10.13 / 5 Constant 39.72±

5204 Mean 0.001422 ± 0.9728 Sigma 0.002102 ± 0.138

T < 20 GeV) da T (15 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 500 1000

1500

2000

2500

3000

3500

Inclusive_DataYBal_ptda15_20 Entries 37515 Mean 0.8997 RMS 0.2336 / ndf

2χ 45.05 / 6 Constant 31.4±

3498 Mean 0.001445 ± 0.9669 Sigma 0.002142 ± 0.1422

T 0

< 25 GeV) da T (20 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 200 400 600 800 1000

1200

1400

Inclusive_DataYBal_ptda20_25 Entries 12551 Mean 0.9144 RMS 0.2042 / ndf

2χ 26.96 / 5 Constant 20.51±

1292 Mean 0.00232 ± 0.9727 Sigma 0.00377 ± 0.1315

T 0 < 20 GeV) da T (25 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 100 200 300 400 500 600 Inclusive_DataYBal_ptda25_30 Entries 5024 Mean 0.9315 RMS 0.1725 / ndf

2χ 2.061 / 4 Constant 14.44±

582.1 Mean 0.003476 ± 0.9779 Sigma 0.005862 ± 0.1212

T 0

< 40 GeV) da T (30 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

100

200

300

400

500 Inclusive_DataYBal_ptda30_40 Entries 3506 Mean 0.9447 RMS 0.1535 / ndf

2χ 2.751 / 3 Constant 13.96±

458.3 Mean 0.003646 ± 0.9894 Sigma 0.005841 ± 0.1009

T 0 > 40 GeV) da T (P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 50 100 150 200 250 300

Inclusive_DataYBal_ptda_gr40 Entries 1834 Mean 0.9615 RMS 0.1307 / ndf

2χ 2.729 / 3 Constant 10.93±

277.8 Mean 0.004076 ± 0.9877 Sigma 0.006136 ± 0.0938

T 0