< 5 GeV) da T (P_{eT} P h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 10 20 30 40 50 60 70 80 Inclusive_DataPtBal_ptda_le5

Entries 722 Mean 0.3311 RMS 0.2433

T P h 0 < 10 GeV) da T (5 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

200 400

600 800

1000

1200

Inclusive_DataPtBal_ptda5_10 Entries 15027 Mean 0.936 RMS 0.2404 / ndf

2χ 10.5 / 7 Constant 16.03±

1100 Mean 0.004229 ± 0.9642 Sigma 0.006648 ± 0.1912

T e h

< 15 GeV) da T (10 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

500 1000

1500

2000

2500

3000

3500

4000

4500

Inclusive_DataPtBal_ptda10_15 Entries 53379 Mean 0.978 RMS 0.2457 / ndf

2χ 3.103 / 7 Constant 32.07±

4399 Mean 0.001889 ± 0.991 Sigma 0.002494 ± 0.1709

T e h < 20 GeV) da T (15 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

500 1000

1500

2000

2500

3000

3500

Inclusive_DataPtBal_ptda15_20 Entries 37515 Mean 0.9318 RMS 0.2516 / ndf

2χ 8.393 / 7 Constant 28.67±

3224 Mean 0.001507 ± 0.987 Sigma 0.002219 ± 0.1549

T e h

< 25 GeV) da T (20 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 200 400 600 800 1000

1200

Inclusive_DataPtBal_ptda20_25 Entries 12551 Mean 0.9424 RMS 0.2155 / ndf

2χ 15.1 / 5 Constant 19.96±

1250 Mean 0.002314 ± 0.993 Sigma 0.00361 ± 0.1295

T e h 0 < 20 GeV) da T (25 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 100 200 300 400 500 600 Inclusive_DataPtBal_ptda25_30 Entries 5024 Mean 0.9578 RMS 0.1832 / ndf

2χ 1.745 / 4 Constant 14.29±

578.6 Mean 0.003334 ± 0.9998 Sigma 0.004605 ± 0.1102

T e h 0

< 40 GeV) da T (30 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

100

200

300

400

500 Inclusive_DataPtBal_ptda30_40 Entries 3506 Mean 0.9728 RMS 0.1572 / ndf

2χ 20.95 / 4 Constant 12.67±

447.9 Mean 0.003632 ± 0.9994 Sigma 0.004658 ± 0.1046

T e h 0 > 40 GeV) da T (P_{eT} P h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 50 100 150 200 250 300 Inclusive_DataPtBal_ptda_gr40 Entries 1834 Mean 0.9831 RMS 0.1339 / ndf

2χ 0.2579 / 2 Constant 11.59±

283.8 Mean 0.005606 ± 0.997 Sigma 0.007822 ± 0.08818

T P h 0