< 5 GeV) da T (P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

5 10 15 20 25 30 35 40 45

Inclusive_DataHadPtHadPtDa_ptda_le5

Entries 722 Mean 1.006 RMS 0.3636

T h 5

< 10 GeV) da T (5 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

200 400 600 800 1000

1200

1400

Inclusive_DataHadPtHadPtDa_ptda5_10

Entries 15027 Mean 0.9569 RMS 0.2401 / ndf

2χ 4.558 / 7 Constant 17.79±

1388 Mean 0.003251 ± 0.9572 Sigma 0.002887 ± 0.1404

T h

< 15 GeV) da T (10 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

1000

2000

3000

4000

5000

Inclusive_DataHadPtHadPtDa_ptda10_15

Entries 53379 Mean 0.9296 RMS 0.2205 / ndf

2χ 22.29 / 6 Constant 37.58±

5017 Mean 0.001221 ± 0.9684 Sigma 0.001869 ± 0.1448

T h < 20 GeV) da T (15 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

500 1000

1500

2000

2500

3000

3500

Inclusive_DataHadPtHadPtDa_ptda15_20

Entries 37515 Mean 0.89 RMS 0.2408 / ndf

2χ 69.77 / 7 Constant 29.32±

3338 Mean 0.001398 ± 0.961 Sigma 0.002049 ± 0.1514

T h

< 25 GeV) da T (20 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 200 400 600 800 1000

1200

1400

Inclusive_DataHadPtHadPtDa_ptda20_25

Entries 12551 Mean 0.9033 RMS 0.2149 / ndf

2χ 27.19 / 5 Constant 20.06±

1238 Mean 0.002435 ± 0.9722 Sigma 0.004039 ± 0.1339

T h 0 < 20 GeV) da T (25 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 100

200 300

400 500

600 Inclusive_DataHadPtHadPtDa_ptda25_30

Entries 5024 Mean 0.9207 RMS 0.1864 / ndf

2χ 2.446 / 4 Constant 14.14±

558.9 Mean 0.003693 ± 0.9769 Sigma 0.006366 ± 0.124

T h 0

< 40 GeV) da T (30 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 50 100 150 200 250 300 350 400 450

Inclusive_DataHadPtHadPtDa_ptda30_40

Entries 3506 Mean 0.9283 RMS 0.1694 / ndf

2χ 7.568 / 4 Constant 12.55±

424 Mean 0.003569 ± 0.9851 Sigma 0.005691 ± 0.1119

T h 0 > 40 GeV) da T (P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

50

100

150

200

250

Inclusive_DataHadPtHadPtDa_ptda_gr40

Entries 1834 Mean 0.9173 RMS 0.1999 / ndf

2χ 4.707 / 5 Constant 8.984±

238.9 Mean 0.004269 ± 0.9873 Sigma 0.005263 ± 0.1063

T h 0