< 5 GeV) da T (P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 10 20 30 40 50 60 70

Inclusive_DjangoYBal_ptda_le5

Entries 253 Mean 0.8209

RMS 0.2786

T

0

T

0

T

0

70 2.5.7

Inclusive_DjangoYBal_ptda5_10 Entries 4309 Mean 0.9544 RMS 0.1857 / ndf

2χ 4.167 / 4 Constant 44.9±

1487 Mean 0.007554 ± 0.982 Sigma 0.01061 ± 0.1358

< 10 GeV) da T (5 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 200 400 600 800 1000

1200

1400

1600

± ±

T

0

± ±

T

0

± ±

T

0

2.5.7

Inclusive_DjangoYBal_ptda10_15 Entries 19986 Mean 0.966 RMS 0.2188 / ndf

2χ 4.607 / 6 Constant 65.32±

5086 Mean 0.002141 ± 0.9935 Sigma 0.002955 ± 0.1394

< 15 GeV) da T (10 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

1000

2000

3000

4000

5000

± ±

T

0

± ±

T

0

± ±

T

0

5000 2.5.7

Inclusive_DjangoYBal_ptda15_20 Entries 23386 Mean 0.9262 RMS 0.2325 / ndf

2χ 29.03 / 7 Constant 40.91±

3560 Mean 0.001663 ± 0.9874 Sigma 0.002149 ± 0.1386

< 20 GeV) da T (15 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 500 1000

1500

2000

2500

3000

3500

± ±

T

0

± ±

T

0

± ±

T

0

3500 2.5.7

Inclusive_DjangoYBal_ptda20_25 Entries 11785 Mean 0.9311 RMS 0.2018 / ndf

2χ 18.02 / 5 Constant 22.57±

1335 Mean 0.002217 ± 0.9926 Sigma 0.003263 ± 0.1221

< 25 GeV) da T (20 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 200 400 600 800 1000

1200

1400

± ±

T

0

± ±

T

0

± ±

T

0

1400 2.5.7

Inclusive_DjangoYBal_ptda25_30 Entries 4940 Mean 0.9468 RMS 0.1709 / ndf

2χ 4.724 / 3 Constant 16.38±

581.9 Mean 0.0037 ± 0.9958 Sigma 0.006555 ± 0.1091

< 20 GeV) da T (25 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

100

200

300

400

500

600

± ±

T

0

± ±

T

0

± ±

T

0

600 2.5.7

Inclusive_DjangoYBal_ptda30_40 Entries 3618 Mean 0.954 RMS 0.1503 / ndf

2χ 0.1751 / 3 Constant 14.72±

466 Mean 0.003832 ± 0.9902 Sigma 0.006342 ± 0.1034

< 40 GeV) da T (30 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

100

200

300

400

500

± ±

T

0

± ±

T

0

± ±

T

0

2.5.7

> 40 GeV) da T (P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

50

100

150

200

250

Inclusive_DjangoYBal_ptda_gr40 Entries 1875 Mean 0.9679 RMS 0.1384 / ndf

2χ 0.8623 / 3 Constant 11±

270.4 Mean 0.003658 ± 0.9995 Sigma 0.005217 ± 0.08798

T

0

± ±

T

0

± ±

T

0

2.5.7