< 5 GeV) da T (P_e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

10

20

30

40

50

60 Inclusive_DjangoPtBal_ptda_le5

Entries 255 Mean 0.3839

RMS 0.2653

T h 0

T h 0

T h 0

2.5.7

Inclusive_DjangoPtBal_ptda5_10 Entries 4309 Mean 0.9678 RMS 0.2437 / ndf

2χ 4.607 / 7 Constant 31.5±

1101 Mean 0.01177 ± 0.982 Sigma 0.01619 ± 0.2028

< 10 GeV) da T (5 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

200

400

600

800

1000

1200

± ±

T e h

± ±

T e h

± ±

T e h

2.5.7

Inclusive_DjangoPtBal_ptda10_15 Entries 19986 Mean 1.007 RMS 0.2492 / ndf

2χ 7.623 / 7 Constant 51.47±

4314 Mean 0.004301 ± 1.008 Sigma 0.004585 ± 0.1774

< 15 GeV) da T (10 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

500 1000

1500

2000

2500

3000

3500

4000

4500

± ±

T e h

± ±

T e h

± ±

T e h

4500 2.5.7

Inclusive_DjangoPtBal_ptda15_20 Entries 23386 Mean 0.9578 RMS 0.2516 / ndf

2χ 9.38 / 7 Constant 39.02±

3299 Mean 0.002062 ± 1.011 Sigma 0.002715 ± 0.1489

< 20 GeV) da T (15 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

500 1000

1500

2000

2500

3000

3500

± ±

T e h

± ±

T e h

± ±

T e h

3500 2.5.7

Inclusive_DjangoPtBal_ptda20_25 Entries 11785 Mean 0.9604 RMS 0.2141 / ndf

2χ 15.92 / 6 Constant 20.4±

1242 Mean 0.002493 ± 1.007 Sigma 0.003578 ± 0.1374

< 25 GeV) da T (20 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 200 400 600 800 1000

1200

1400

± ±

T e h 0

± ±

T e h 0

± ±

T e h 0

2.5.7

Inclusive_DjangoPtBal_ptda25_30 Entries 4940 Mean 0.9813 RMS 0.1833 / ndf

2χ 6.382 / 5 Constant 13.55±

536 Mean 0.003864 ± 1.012 Sigma 0.005045 ± 0.1221

< 20 GeV) da T (25 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

100

200

300

400

500 ± ±

T e h 0

± ±

T e h 0

± ±

T e h 0

2.5.7

Inclusive_DjangoPtBal_ptda30_40 Entries 3618 Mean 0.9873 RMS 0.1605 / ndf

2χ 0.5798 / 3 Constant 13.25±

448.5 Mean 0.00648 ± 1.001 Sigma 0.008015 ± 0.1096

< 40 GeV) da T (30 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 50 100 150 200 250 300 350 400 450

± ±

T e h 0

± ±

T e h 0

± ±

T e h 0

450 2.5.7

Inclusive_DjangoPtBal_ptda_gr40 Entries 1875 Mean 0.9918 RMS 0.1445 / ndf

2χ 3.859 / 3 Constant 10.5±

254.6 Mean 0.005325 ± 1.014 Sigma 0.00727 ± 0.09677

> 40 GeV) da T (P_e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

50

100

150

200

250 ± ±

T h 0

± ±

T h 0

± ±

T h 0

250 2.5.7