< 5 GeV) da T (P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

10

20

30

40

50

60 Inclusive_DjangoHadPtHadPtDa_ptda_le5

Entries 255 Mean 1.062

RMS 0.3457

T h 0

T h 0

T h 0

2.5.7

Inclusive_DjangoHadPtHadPtDa_ptda5_10

Entries 4309 Mean 1.002 RMS 0.2653 / ndf

2χ 10.33 / 7 Constant 35.52±

1305 Mean 0.009989 ± 0.9713 Sigma 0.007917 ± 0.1521

< 10 GeV) da T (5 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

200 400 600 800 1000

1200

1400

± ±

T h

± ±

T h

± ±

T h

2.5.7

Inclusive_DjangoHadPtHadPtDa_ptda10_15

Entries 19986 Mean 0.9609 RMS 0.2282 / ndf

2χ 5.493 / 6 Constant 63.95±

4923 Mean 0.002288 ± 0.9911 Sigma 0.003165 ± 0.142

< 15 GeV) da T (10 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

1000

2000

3000

4000

5000

± ±

T h

± ±

T h

± ±

T h

5000 2.5.7

Inclusive_DjangoHadPtHadPtDa_ptda15_20

Entries 23386 Mean 0.9171 RMS 0.2409 / ndf

2χ 31.25 / 7 Constant 39.94±

3441 Mean 0.001737 ± 0.9858 Sigma 0.002273 ± 0.1409

< 20 GeV) da T (15 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

500 1000

1500

2000

2500

3000

3500

± ±

T h

± ±

T h

± ±

T h

3500 2.5.7

Inclusive_DjangoHadPtHadPtDa_ptda20_25

Entries 11785 Mean 0.9195 RMS 0.2122 / ndf

2χ 37.69 / 6 Constant 20.51±

1248 Mean 0.002348 ± 0.9848 Sigma 0.003509 ± 0.1367

< 25 GeV) da T (20 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 200 400 600 800 1000

1200

1400

± ±

T h 0

± ±

T h 0

± ±

T h 0

2.5.7

Inclusive_DjangoHadPtHadPtDa_ptda25_30

Entries 4940 Mean 0.9341 RMS 0.1841 / ndf

2χ 8.431 / 4 Constant 14.39±

528.9 Mean 0.004368 ± 0.9902 Sigma 0.007949 ± 0.1309

< 20 GeV) da T (25 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

100

200

300

400

500 ± ±

T h 0

± ±

T h 0

± ±

T h 0

2.5.7

Inclusive_DjangoHadPtHadPtDa_ptda30_40

Entries 3618 Mean 0.9374 RMS 0.1701 / ndf

2χ 0.91 / 4 Constant 12.94±

428.6 Mean 0.003689 ± 0.9861 Sigma 0.005812 ± 0.1123

< 40 GeV) da T (30 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 50 100 150 200 250 300 350 400 450

± ±

T h 0

± ±

T h 0

± ±

T h 0

450 2.5.7

Inclusive_DjangoHadPtHadPtDa_ptda_gr40

Entries 1875 Mean 0.9287 RMS 0.1959 / ndf

2χ 5.271 / 5 Constant 9.068±

230.5 Mean 0.003773 ± 0.9962 Sigma 0.004776 ± 0.1018

> 40 GeV) da T (P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

50

100

150

200

250

± ±

T h 0

± ±

T h 0

± ±

T h 0

2.5.7