< 5 GeV) da T (P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 10 20 30 40 50 60 70

Inclusive_DataYBal_ptda_le5

Entries 797 Mean 0.8683

RMS 0.281

T

0

T

0

T

0

70 2.5.7

Inclusive_DataYBal_ptda5_10 Entries 15053 Mean 0.9304 RMS 0.1862 / ndf

2χ 0.8906 / 4 Constant 22.4±

1472 Mean 0.003137 ± 0.9602 Sigma 0.005569 ± 0.1408

< 10 GeV) da T (5 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

200 400 600 800 1000

1200

1400 ± ±

T

± ±

T

± ±

T

1400 2.5.7

Inclusive_DataYBal_ptda10_15 Entries 53197 Mean 0.9421 RMS 0.2146 / ndf

2χ 8.143 / 5 Constant 39.84±

5165 Mean 0.001361 ± 0.9777 Sigma 0.002082 ± 0.1374

< 15 GeV) da T (10 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

1000

2000

3000

4000

5000 ± ±

T

0

± ±

T

0

± ±

T

0

5000 2.5.7

Inclusive_DataYBal_ptda15_20 Entries 37430 Mean 0.9093 RMS 0.2354 / ndf

2χ 39.42 / 6 Constant 31.38±

3452 Mean 0.001467 ± 0.9757 Sigma 0.002335 ± 0.1464

< 20 GeV) da T (15 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 500 1000

1500

2000

2500

3000

3500

± ±

T

0

± ±

T

0

± ±

T

0

3500 2.5.7

Inclusive_DataYBal_ptda20_25 Entries 12534 Mean 0.9246 RMS 0.2054 / ndf

2χ 9.419 / 5 Constant 20.45±

1314 Mean 0.00215 ± 0.985 Sigma 0.003072 ± 0.1228

< 25 GeV) da T (20 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 200 400 600 800 1000

1200

1400

± ±

T

0

± ±

T

0

± ±

T

0

2.5.7

Inclusive_DataYBal_ptda25_30 Entries 4999 Mean 0.9415 RMS 0.174 / ndf

2χ 0.8648 / 4 Constant 14.44±

583.5 Mean 0.003358 ± 0.9889 Sigma 0.005401 ± 0.1179

< 20 GeV) da T (25 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

100

200

300

400

500

600

± ±

T

0

± ±

T

0

± ±

T

0

600 2.5.7

Inclusive_DataYBal_ptda30_40 Entries 3476 Mean 0.9564 RMS 0.1533 / ndf

2χ 2.715 / 3 Constant 14.07±

464 Mean 0.003331 ± 1.001 Sigma 0.005445 ± 0.09917

< 40 GeV) da T (30 GeV < P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

100

200

300

400

500

± ±

T

0

± ±

T

0

± ±

T

0

2.5.7

> 40 GeV) da T (P day hy 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

50

100

150

200

250

Inclusive_DataYBal_ptda_gr40 Entries 1816 Mean 0.9725 RMS 0.1336 / ndf

2χ 0.429 / 2 Constant 11.41±

269 Mean 0.006085 ± 0.9995 Sigma 0.009351 ± 0.09276

T

0

± ±

T

0

± ±

T

0

2.5.7