< 5 GeV) da T (P_e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 10 20 30 40 50 60 70

Inclusive_DataPtBal_ptda_le5

Entries 801 Mean 0.3378

RMS 0.2458

T h 0

T h 0

T h 0

70 2.5.7

Inclusive_DataPtBal_ptda5_10 Entries 15053 Mean 0.9408 RMS 0.243 / ndf

2χ 9.604 / 7 Constant 16.19±

1094 Mean 0.004033 ± 0.9707 Sigma 0.00672 ± 0.1914

< 10 GeV) da T (5 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

200

400

600

800

1000

1200

± ±

T e h 0

± ±

T e h 0

± ±

T e h 0

2.5.7

Inclusive_DataPtBal_ptda10_15 Entries 53197 Mean 0.9862 RMS 0.2473 / ndf

2χ 5.358 / 6 Constant 32.13±

4359 Mean 0.002596 ± 0.9981 Sigma 0.003218 ± 0.1711

< 15 GeV) da T (10 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

500 1000

1500

2000

2500

3000

3500

4000

4500

± ±

T e h

± ±

T e h

± ±

T e h

4500 2.5.7

Inclusive_DataPtBal_ptda15_20 Entries 37430 Mean 0.9426 RMS 0.2537 / ndf

2χ 16.39 / 8 Constant 27.36±

3192 Mean 0.001456 ± 0.9966 Sigma 0.001934 ± 0.1576

< 20 GeV) da T (15 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

500 1000

1500

2000

2500

3000

3500

± ±

T e h

± ±

T e h

± ±

T e h

2.5.7

Inclusive_DataPtBal_ptda20_25 Entries 12534 Mean 0.9538 RMS 0.2168 / ndf

2χ 18.24 / 6 Constant 18.97±

1242 Mean 0.002194 ± 1.004 Sigma 0.003059 ± 0.1327

< 25 GeV) da T (20 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 200 400 600 800 1000

1200

1400

± ±

T e h 0

± ±

T e h 0

± ±

T e h 0

2.5.7

Inclusive_DataPtBal_ptda25_30 Entries 4999 Mean 0.9695 RMS 0.1849 / ndf

2χ 2.756 / 4 Constant 14.32±

567.2 Mean 0.003462 ± 1.008 Sigma 0.005447 ± 0.1166

< 20 GeV) da T (25 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

100

200

300

400

500

600

± ±

T e h 0

± ±

T e h 0

± ±

T e h 0

600 2.5.7

Inclusive_DataPtBal_ptda30_40 Entries 3476 Mean 0.9868 RMS 0.1585 / ndf

2χ 3.184 / 3 Constant 13.79±

458.8 Mean 0.00365 ± 1.018 Sigma 0.004879 ± 0.09396

< 40 GeV) da T (30 GeV < P e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

100

200

300

400

500

± ±

T e h 0

± ±

T e h 0

± ±

T e h 0

500 2.5.7

Inclusive_DataPtBal_ptda_gr40 Entries 1816 Mean 0.9969 RMS 0.1363 / ndf

2χ 7.436 / 3 Constant 10.94±

272.9 Mean 0.004706 ± 1.015 Sigma 0.006482 ± 0.09289

> 40 GeV) da T (P_e TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

50

100

150

200

250

300

± ±

T h 0

± ±

T h 0

± ±

T h 0

300 2.5.7