< 5 GeV) da T (P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

10

20

30

40

50 60

Inclusive_DataHadPtHadPtDa_ptda_le5

Entries 801 Mean 1.032

RMS 0.3556

T h 0

T h 0

T h 0

60 2.5.7

Inclusive_DataHadPtHadPtDa_ptda5_10

Entries 15053 Mean 0.9728 RMS 0.2568 / ndf

2χ 2.848 / 7 Constant 17.4±

1342 Mean 0.003428 ± 0.958 Sigma 0.003105 ± 0.1441

< 10 GeV) da T (5 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

200 400 600 800 1000

1200

1400

± ±

T h

± ±

T h

± ±

T h

2.5.7

Inclusive_DataHadPtHadPtDa_ptda10_15

Entries 53197 Mean 0.9367 RMS 0.2231 / ndf

2χ 8.735 / 6 Constant 36.56±

4998 Mean 0.001442 ± 0.9769 Sigma 0.001784 ± 0.1407

< 15 GeV) da T (10 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

1000

2000

3000

4000

5000

± ±

T h

± ±

T h

± ±

T h

5000 2.5.7

Inclusive_DataHadPtHadPtDa_ptda15_20

Entries 37430 Mean 0.8999 RMS 0.2432 / ndf

2χ 66.6 / 7 Constant 29.13±

3282 Mean 0.001495 ± 0.9705 Sigma 0.002301 ± 0.1571

< 20 GeV) da T (15 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

500 1000

1500

2000

2500

3000

3500

± ±

T h

± ±

T h

± ±

T h

3500 2.5.7

Inclusive_DataHadPtHadPtDa_ptda20_25

Entries 12534 Mean 0.9138 RMS 0.2164 / ndf

2χ 30.78 / 6 Constant 18.92±

1234 Mean 0.002158 ± 0.9787 Sigma 0.003147 ± 0.1348

< 25 GeV) da T (20 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 200 400 600 800 1000

1200 ± ±

T h 0

± ±

T h 0

± ±

T h 0

2.5.7

Inclusive_DataHadPtHadPtDa_ptda25_30

Entries 4999 Mean 0.9317 RMS 0.189 / ndf

2χ 0.8317 / 4 Constant 14.14±

559.3 Mean 0.003559 ± 0.9888 Sigma 0.005883 ± 0.1205

< 20 GeV) da T (25 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

100

200

300

400

500

600

± ±

T h 0

± ±

T h 0

± ±

T h 0

2.5.7

Inclusive_DataHadPtHadPtDa_ptda30_40

Entries 3476 Mean 0.9407 RMS 0.1707 / ndf

2χ 8.657 / 4 Constant 12.52±

426.5 Mean 0.003749 ± 0.9983 Sigma 0.005693 ± 0.112

< 40 GeV) da T (30 GeV < P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 50 100 150 200 250 300 350 400 450

± ±

T h 0

± ±

T h 0

± ±

T h 0

450 2.5.7

Inclusive_DataHadPtHadPtDa_ptda_gr40

Entries 1816 Mean 0.9311 RMS 0.2024 / ndf

2χ 3.203 / 5 Constant 8.916±

233 Mean 0.003793 ± 0.9975 Sigma 0.004881 ± 0.104

> 40 GeV) da T (P da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

50

100

150

200

250

± ±

T h 0

± ±

T h 0

± ±

T h 0

250 2.5.7