Inclusive_DataHadPtHadPtDa_gamhe_le10

Entries 11848 Mean 0.7686 RMS 0.297 / ndf

2χ 37.53 / 8 Constant 11.13±

719 Mean 0.02009 ± 0.9456 Sigma 0.03492 ± 0.3488

)° < 10 e hγ (_{da} TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 100 200 300 400 500 600 700 800

± ±

e h 0

± ±

e h 0

± ±

e h 0

800 2.5.7

Inclusive_DataHadPtHadPtDa_gamhe10_20

Entries 9684 Mean 0.8885 RMS 0.2463 / ndf

2χ 75.94 / 7 Constant 15.63±

911.9 Mean 0.002352 ± 0.9654 Sigma 0.003187 ± 0.1385

)° < 20 e hγ <° (10 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

200

400

600

800

1000

± ±

e h

± ±

e h

± ±

e h

1000 2.5.7

Inclusive_DataHadPtHadPtDa_gamhe20_30

Entries 9219 Mean 0.9387 RMS 0.2256 / ndf

2χ 8.097 / 6 Constant 16.42±

951.9 Mean 0.002684 ± 0.987 Sigma 0.003354 ± 0.1299

)° < 30 e hγ <° (20 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

200

400

600

800

1000

± ±

e h

± ±

e h

± ±

e h

1000 2.5.7

Inclusive_DataHadPtHadPtDa_gamhe30_40

Entries 8271 Mean 0.967 RMS 0.2093 / ndf

2χ 5.107 / 5 Constant 15.52±

846.9 Mean 0.004125 ± 0.9948 Sigma 0.005194 ± 0.1374

)° < 40 e hγ <° (30 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 100 200 300 400 500 600 700 800 900

± ±

e h 0

± ±

e h 0

± ±

e h 0

900 2.5.7

Inclusive_DataHadPtHadPtDa_gamhe40_50

Entries 7530 Mean 0.9705 RMS 0.2027 / ndf

2χ 3.959 / 5 Constant 15.42±

807 Mean 0.003435 ± 1.002 Sigma 0.004178 ± 0.1257

)° < 50 e hγ <° (40 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

100 200 300 400 500 600 700 800

± ±

e h

± ±

e h

± ±

e h

800 2.5.7

Inclusive_DataHadPtHadPtDa_gamhe50_60

Entries 6899 Mean 0.9736 RMS 0.201 / ndf

2χ 6.842 / 5 Constant 14.22±

717 Mean 0.004328 ± 0.9935 Sigma 0.005155 ± 0.133

)° < 60 e hγ <° (50 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

100 200 300 400 500 600 700 800

± ±

e h

± ±

e h

± ±

e h

2.5.7

Inclusive_DataHadPtHadPtDa_gamhe60_70

Entries 6632 Mean 0.9696 RMS 0.1993 / ndf

2χ 1.378 / 5 Constant 14.3±

704.8 Mean 0.003876 ± 0.9964 Sigma 0.004499 ± 0.1256

)° < 70 e hγ <° (60 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

100 200 300 400 500 600 700

± ±

e h

± ±

e h

± ±

e h

700 2.5.7

Inclusive_DataHadPtHadPtDa_gamhe70_80

Entries 6569 Mean 0.9665 RMS 0.2018 / ndf

2χ 2.624 / 5 Constant 13.89±

681.6 Mean 0.004456 ± 0.9879 Sigma 0.004955 ± 0.1287

)° < 80 e hγ <° (70 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

100 200 300 400 500 600 700

± ±

e h

± ±

e h

± ±

e h

700 2.5.7

Inclusive_DataHadPtHadPtDa_gamhe80_90

Entries 6575 Mean 0.9572 RMS 0.2095 / ndf

2χ 6.703 / 6 Constant 13.32±

654.1 Mean 0.003564 ± 0.9792 Sigma 0.004209 ± 0.1325

)° < 90 e hγ <° (80 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

100 200 300 400 500 600 700

± ±

e h

± ±

e h

± ±

e h

2.5.7

Inclusive_DataHadPtHadPtDa_gamhe90_100

Entries 6890 Mean 0.9531 RMS 0.214 / ndf

2χ 8.975 / 6 Constant 13.18±

659.6 Mean 0.004195 ± 0.9714 Sigma 0.005025 ± 0.1419

)° < 100 e hγ <° (90 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

100 200 300 400 500 600 700

± ±

e h

± ±

e h

± ±

e h

2.5.7

Inclusive_DataHadPtHadPtDa_gamhe100_110

Entries 7276 Mean 0.956 RMS 0.2167 / ndf

2χ 7.384 / 6 Constant 13.66±

689.3 Mean 0.003943 ± 0.9734 Sigma 0.004916 ± 0.1413

)° < 110 e hγ <° (100 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

100 200 300 400 500 600 700 800

± ±

e h

± ±

e h

± ±

e h

2.5.7

Inclusive_DataHadPtHadPtDa_gamhe110_120

Entries 7939 Mean 0.9411 RMS 0.221 / ndf

2χ 7.433 / 6 Constant 14.16±

756.3 Mean 0.003811 ± 0.9685 Sigma 0.004322 ± 0.1364

)° < 120 e hγ <° (110 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

100 200 300 400 500 600 700 800

± ±

e h

± ±

e h

± ±

e h

2.5.7

Inclusive_DataHadPtHadPtDa_gamhe120_130

Entries 8909 Mean 0.9411 RMS 0.2232 / ndf

2χ 8.332 / 6 Constant 15.13±

847.8 Mean 0.003525 ± 0.9663 Sigma 0.003994 ± 0.1344

)° < 130 e hγ <° (120 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 100 200 300 400 500 600 700 800 900

± ±

e h 0

± ±

e h 0

± ±

e h 0

900 2.5.7

Inclusive_DataHadPtHadPtDa_gamhe130_140

Entries 9676 Mean 0.933 RMS 0.22 / ndf

2χ 2.934 / 5 Constant 16.19±

886.2 Mean 0.003538 ± 0.9693 Sigma 0.004956 ± 0.1371

)° < 140 e hγ <° (130 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 100 200 300 400 500 600 700 800 900

± ±

e h 0

± ±

e h 0

± ±

e h 0

900 2.5.7

Inclusive_DataHadPtHadPtDa_gamhe140_150

Entries 10051 Mean 0.9275 RMS 0.2187 / ndf

2χ 18.82 / 6 Constant 15.7±

891.9 Mean 0.00315 ± 0.9643 Sigma 0.004789 ± 0.1492

)° < 150 e hγ <° (140 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 100 200 300 400 500 600 700 800 900

± ±

e h 0

± ±

e h 0

± ±

e h 0

900 2.5.7

Inclusive_DataHadPtHadPtDa_gamhe_gr150

Entries 5338 Mean 0.9116 RMS 0.221 / ndf

2χ 3.711 / 6 Constant 10.72±

442.5 Mean 0.005369 ± 0.9472 Sigma 0.007609 ± 0.1565

)° > 150 e hγ (_{da} TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 50 100 150 200 250 300 350 400 450

± ±

e h 0

± ±

e h 0

± ±

e h 0

450 2.5.7