)° < 10 e hγ (_{da} TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 100 200 300 400 500 600 700 800 900 Inclusive_DataHadPtHadPtDa_gamhe_le10

Entries 11880 Mean 0.7577 RMS 0.2925 / ndf

2χ 37.48 / 9 Constant 11.28±

734.1 Mean 0.009771 ± 0.9044 Sigma 0.01628 ± 0.2897

e h 0 )° < 20 e hγ <° (10 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

200

400

600

800

1000

Inclusive_DataHadPtHadPtDa_gamhe10_20

Entries 9705 Mean 0.8748 RMS 0.2403 / ndf

2χ 51.91 / 6 Constant 16.06±

911 Mean 0.002816 ± 0.9574 Sigma 0.004346 ± 0.1446

e h

)° < 30 e hγ <° (20 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

200

400

600

800

1000

Inclusive_DataHadPtHadPtDa_gamhe20_30

Entries 9236 Mean 0.922 RMS 0.2206 / ndf

2χ 9.408 / 6 Constant 16.87±

976.9 Mean 0.00223 ± 0.9687 Sigma 0.002964 ± 0.1257

e h )° < 40 e hγ <° (30 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

100 200 300 400 500 600 700 800 900 Inclusive_DataHadPtHadPtDa_gamhe30_40

Entries 8279 Mean 0.95 RMS 0.2051 / ndf

2χ 1.4 / 5 Constant 16.15±

848.9 Mean 0.003334 ± 0.9788 Sigma 0.005209 ± 0.1385

e h

)° < 50 e hγ <° (40 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

100 200 300 400 500 600 700 800

Inclusive_DataHadPtHadPtDa_gamhe40_50

Entries 7551 Mean 0.956 RMS 0.1971 / ndf

2χ 0.7175 / 5 Constant 16.04±

816.7 Mean 0.002774 ± 0.9879 Sigma 0.004121 ± 0.1262

e h )° < 60 e hγ <° (50 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

100 200 300 400 500 600 700 800 Inclusive_DataHadPtHadPtDa_gamhe50_60

Entries 6910 Mean 0.9614 RMS 0.1957 / ndf

2χ 4.514 / 4 Constant 15.66±

719 Mean 0.004408 ± 0.9887 Sigma 0.006716 ± 0.1309

e h

)° < 70 e hγ <° (60 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 100 200 300 400 500 600 700

Inclusive_DataHadPtHadPtDa_gamhe60_70

Entries 6645 Mean 0.9602 RMS 0.1975 / ndf

2χ 2.295 / 4 Constant 15.12±

694.7 Mean 0.004608 ± 0.9896 Sigma 0.006872 ± 0.1325

e h 0 )° < 80 e hγ <° (70 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

100 200 300 400 500 600 700

Inclusive_DataHadPtHadPtDa_gamhe70_80

Entries 6582 Mean 0.959 RMS 0.199 / ndf

2χ 5.274 / 5 Constant 14.44±

678.1 Mean 0.003769 ± 0.9788 Sigma 0.005772 ± 0.1376

e h

)° < 90 e hγ <° (80 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

100 200 300 400 500 600 700 Inclusive_DataHadPtHadPtDa_gamhe80_90

Entries 6579 Mean 0.9505 RMS 0.2051 / ndf

2χ 2.39 / 5 Constant 14.16±

663.1 Mean 0.003521 ± 0.9757 Sigma 0.004936 ± 0.1302

e h )° < 100 e hγ <° (90 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

100 200 300 400 500 600 700 Inclusive_DataHadPtHadPtDa_gamhe90_100

Entries 6891 Mean 0.9465 RMS 0.209 / ndf

2χ 3.003 / 5 Constant 13.99±

665.1 Mean 0.00444 ± 0.9671 Sigma 0.006424 ± 0.1429

e h

)° < 110 e hγ <° (100 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

100 200 300 400 500 600 700

Inclusive_DataHadPtHadPtDa_gamhe100_110

Entries 7271 Mean 0.949 RMS 0.2119 / ndf

2χ 1.549 / 6 Constant 13.72±

704.8 Mean 0.003757 ± 0.9722 Sigma 0.004415 ± 0.1367

e h )° < 120 e hγ <° (110 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

100 200 300 400 500 600 700 800 Inclusive_DataHadPtHadPtDa_gamhe110_120

Entries 7940 Mean 0.9344 RMS 0.2165 / ndf

2χ 3.884 / 5 Constant 15.08±

770.2 Mean 0.00364 ± 0.9672 Sigma 0.00479 ± 0.1317

e h

)° < 130 e hγ <° (120 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 100 200 300 400 500 600 700 800 900 Inclusive_DataHadPtHadPtDa_gamhe120_130

Entries 8927 Mean 0.9337 RMS 0.2175 / ndf

2χ 4.373 / 5 Constant 16.16±

866.6 Mean 0.003532 ± 0.963 Sigma 0.00463 ± 0.1313

e h 0 )° < 140 e hγ <° (130 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

200

400

600

800

1000

Inclusive_DataHadPtHadPtDa_gamhe130_140

Entries 9694 Mean 0.927 RMS 0.2148 / ndf

2χ 9.527 / 6 Constant 15.87±

901.4 Mean 0.002736 ± 0.9656 Sigma 0.003905 ± 0.1388

e h 0

)° < 150 e hγ <° (140 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

200

400

600

800

1000

Inclusive_DataHadPtHadPtDa_gamhe140_150

Entries 10087 Mean 0.9224 RMS 0.2152 / ndf

2χ 22.23 / 6 Constant 15.77±

902.5 Mean 0.003151 ± 0.964 Sigma 0.004752 ± 0.1492

e h )° > 150 e hγ (_{da} TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 50 100 150 200 250 300 350 400 450

Inclusive_DataHadPtHadPtDa_gamhe_gr150

Entries 5381 Mean 0.9039 RMS 0.2186 / ndf

2χ 7.779 / 6 Constant 10.96±

453.8 Mean 0.005313 ± 0.9439 Sigma 0.007278 ± 0.1527

e h 0