)° < 10 hγ (_{da} TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 100 200 300 400 500 600 700 800 900 Inclusive_DataHadPtHadPtDa_gamh_le10

Entries 12256 Mean 0.6894 RMS 0.2652 / ndf

2χ 114.2 / 8 Constant 13.75±

792.5 Mean 0.005474 ± 0.7301 Sigma 0.009533 ± 0.2141

h 0 )° < 20 hγ <° (10 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 200 400 600 800 1000

1200

1400

1600

Inclusive_DataHadPtHadPtDa_gamh10_20

Entries 14707 Mean 0.8909 RMS 0.2335 / ndf

2χ 20.91 / 7 Constant 20.92±

1604 Mean 0.001521 ± 0.9568 Sigma 0.001841 ± 0.1242

h 0

)° < 30 hγ <° (20 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0

200

400

600

800

1000

Inclusive_DataHadPtHadPtDa_gamh20_30

Entries 10618 Mean 0.9492 RMS 0.2092 / ndf

2χ 2.621 / 5 Constant 17.84±

1061 Mean 0.003427 ± 0.9717 Sigma 0.005254 ± 0.1445

h 0 )° < 40 hγ <° (30 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

100 200 300 400 500 600 700 800 900

Inclusive_DataHadPtHadPtDa_gamh30_40

Entries 8758 Mean 0.9694 RMS 0.1982 / ndf

2χ 1.093 / 5 Constant 15.98±

908.3 Mean 0.004184 ± 0.9908 Sigma 0.005002 ± 0.1364

h

)° < 50 hγ <° (40 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 100 200 300 400 500 600 700 800 900 Inclusive_DataHadPtHadPtDa_gamh40_50

Entries 7599 Mean 0.9718 RMS 0.182 / ndf

2χ 5.51 / 4 Constant 16.71±

823.5 Mean 0.003915 ± 0.9954 Sigma 0.006225 ± 0.1317

h 0 )° < 60 hγ <° (50 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 100 200 300 400 500 600 700 800

Inclusive_DataHadPtHadPtDa_gamh50_60

Entries 6873 Mean 0.9685 RMS 0.1911 / ndf

2χ 20.89 / 4 Constant 15.78±

733.6 Mean 0.003859 ± 0.9919 Sigma 0.005479 ± 0.1224

h 0

)° < 70 hγ <° (60 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

100 200 300 400 500 600 700

Inclusive_DataHadPtHadPtDa_gamh60_70

Entries 6615 Mean 0.9677 RMS 0.1931 / ndf

2χ 2.391 / 5 Constant 13.89±

687.4 Mean 0.004518 ± 0.9878 Sigma 0.005046 ± 0.13

h )° < 80 hγ <° (70 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 100 200 300 400 500 600

Inclusive_DataHadPtHadPtDa_gamh70_80

Entries 6248 Mean 0.9685 RMS 0.1884 / ndf

2χ 0.7832 / 4 Constant 14.44±

635.1 Mean 0.005096 ± 0.9872 Sigma 0.007495 ± 0.1335

h 0

)° < 90 hγ <° (80 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 100 200 300 400 500 600

Inclusive_DataHadPtHadPtDa_gamh80_90

Entries 6361 Mean 0.9648 RMS 0.1954 / ndf

2χ 4.847 / 4 Constant 13.79±

628.2 Mean 0.006215 ± 0.9773 Sigma 0.008141 ± 0.1376

h 0 )° < 100 hγ <° (90 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 100 200 300 400 500 600 700 Inclusive_DataHadPtHadPtDa_gamh90_100

Entries 6363 Mean 0.9619 RMS 0.1937 / ndf

2χ 5.556 / 4 Constant 14.21±

650.3 Mean 0.005389 ± 0.9733 Sigma 0.006527 ± 0.1274

h 0

)° < 110 hγ <° (100 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 100 200 300 400 500 600 700

Inclusive_DataHadPtHadPtDa_gamh100_110

Entries 6848 Mean 0.9641 RMS 0.1994 / ndf

2χ 2.657 / 5 Constant 13.56±

671.5 Mean 0.005504 ± 0.979 Sigma 0.00596 ± 0.1368

h 0 )° < 120 hγ <° (110 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 100 200 300 400 500 600 700 800 Inclusive_DataHadPtHadPtDa_gamh110_120

Entries 7560 Mean 0.9586 RMS 0.1961 / ndf

2χ 3.465 / 4 Constant 15.58±

766 Mean 0.004443 ± 0.9828 Sigma 0.00578 ± 0.1265

h 0

)° < 130 hγ <° (120 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 100 200 300 400 500 600 700 800 900 Inclusive_DataHadPtHadPtDa_gamh120_130

Entries 8023 Mean 0.9459 RMS 0.1945 / ndf

2χ 4.733 / 5 Constant 15.94±

826.8 Mean 0.003349 ± 0.9637 Sigma 0.004363 ± 0.1271

h 0 )° < 140 hγ <° (130 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 100 200 300 400 500 600 700 800 900

Inclusive_DataHadPtHadPtDa_gamh130_140

Entries 8405 Mean 0.9312 RMS 0.2077 / ndf

2χ 6.325 / 5 Constant 16.19±

841.7 Mean 0.002933 ± 0.9735 Sigma 0.003934 ± 0.1236

h 0

)° < 150 hγ <° (140 da TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

0 100 200 300 400 500 600 700

Inclusive_DataHadPtHadPtDa_gamh140_150

Entries 7552 Mean 0.9122 RMS 0.2142 / ndf

2χ 13.78 / 6 Constant 13.91±

705.9 Mean 0.003255 ± 0.9587 Sigma 0.004424 ± 0.139

h 0 )° > 150 hγ (_{da} TP h TP 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

# Entries

50 100 150 200 250 300 350 400 Inclusive_DataHadPtHadPtDa_gamh_gr150

Entries 4772 Mean 0.8353 RMS 0.2809 / ndf

2χ 19.09 / 9 Constant 8.718±

364.6 Mean 0.004832 ± 0.8897 Sigma 0.006065 ± 0.1736

h