Transverse Polarimeter

0 20 40 60

0 1000 2000 3000 4000 5000 x 10^2

1 10 10^2

0 1000 2000 3000 4000 5000 x 10^2

25 50 75 100

0 1000 2000 3000 4000 5000 x 10^2

0.99 1 1.01

0 1000 2000 3000 4000 5000 x 10^2

0 1 2 3 4 5 6

2005_05.25-05.31

-10 0 10 20

0 1000 2000 3000 4000 5000 x 10^2

0.4 0.6

0 1000 2000 3000 4000 5000 x 10^2

-0.1 0 0.1

0 1000 2000 3000 4000 5000 x 10^2

-0.5 0 0.5

0 1000 2000 3000 4000 5000

x 10^2

-2 0 2

0 1000 2000 3000 4000 5000 x 10^2

0 1 2 3 4 5 6 -10 0 10

0 1000 2000 3000 4000 5000

x 10^2

Linear Light 2005_05.25-05.31

0 10 20 30

0 1000 2000 3000 4000 5000 x 10^2

-50 0 50

0 1000 2000 3000 4000 5000 x 10^2

1400

1600

1800

0 1000 2000 3000 4000 5000 x 10^2

0 1 2 3 4 5 6

HERA (min)

TPOL Down Efficiency

Tuning 878. 146. 83.4%

Lumi Run (37.1%) 2883. 13. 99.6%

HV Off 48. 40. 17.0%