Transverse Polarimeter

0 20 40 60

0 1000 2000 3000 4000 5000 6000 x 10^2

1 10

0 1000 2000 3000 4000 5000 6000 x 10^2

25 50 75 100

0 1000 2000 3000 4000 5000 6000 x 10^2

0.99 1 1.01

0 1000 2000 3000 4000 5000 6000 x 10^2

0 1 2 3 4 5 6 7 8

2003_12.09-12.17

-10 0 10 20

0 1000 2000 3000 4000 5000 6000 x 10^2

0.4 0.6

0 1000 2000 3000 4000 5000 6000 x 10^2

-0.1 0 0.1

0 1000 2000 3000 4000 5000 6000 x 10^2

-2 0 2

0 1000 2000 3000 4000 5000 6000 x 10^2

0 1 2 3 4 5 6 7 8