Table pos = 22.38 mm

0 200 400 600 800 1000

1200

0 10 20 30 40 50 60

ID Entries Mean RMS

100 8237 45.12 17.77

cypos(1) (mm)

Table pos = 22.38 mm

0 2 4 6 8 10 12 14 16 18

0 10 20 30 40 50 60

ID Entries Mean RMS

102 9585 29.45 16.82

Table pos = 22.38 mm

0 50 100 150 200 250 300 350 400

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 12396 10.85 5.084

eud (GeV)

Table pos = 22.38 mm

0 2 4 6 8 10 12 14 16 18

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 15213 13.28 4.814 123.8 / 40 P1 0.4526 0.1051

(GeV)

Table pos = 19.38 mm

0 200 400 600 800 1000

1200

1400

1600

0 10 20 30 40 50 60

ID Entries Mean RMS

100 16812 48.49 15.67

cypos(1) (mm)

Table pos = 19.38 mm

0

5

10

15

20

25

0 10 20 30 40 50 60

ID Entries Mean RMS

102 19838 30.02 17.66

Table pos = 19.38 mm

0 100 200 300 400 500 600 700

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 22665 10.70 4.681

eud (GeV)

Table pos = 19.38 mm

0 2 4 6 8 10 12

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 28780 12.83 4.632 72.17 / 40 P1 0.4953 0.1099

(GeV)

Table pos = 16.38 mm

0 200 400 600 800 1000

1200

1400

1600

1800

0 10 20 30 40 50 60

ID Entries Mean RMS

100 16551 47.31 14.73

cypos(1) (mm)

Table pos = 16.38 mm

0 2 4 6 8 10 12

0 10 20 30 40 50 60

ID Entries Mean RMS

102 19965 30.96 16.80

Table pos = 16.38 mm

0 100 200 300 400 500 600 700 800

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 20947 9.708 4.324

eud (GeV)

Table pos = 16.38 mm

0 2 4 6 8 10

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 27548 11.74 4.681 22.17 / 39 P1 0.3595 0.9481E-01

(GeV)

Table pos = 13.38 mm

0 200 400 600 800 1000

1200

1400

1600

0 10 20 30 40 50 60

ID Entries Mean RMS

100 18517 45.02 14.78

cypos(1) (mm)

Table pos = 13.38 mm

0 5 10 15 20 25

0 10 20 30 40 50 60

ID Entries Mean RMS

102 21439 29.17 16.81

Table pos = 13.38 mm

0 100 200 300 400 500 600 700 800 900

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 23390 9.495 4.249

eud (GeV)

Table pos = 13.38 mm

0 2 4 6 8 10 12 14 16 18

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 29141 11.65 4.935 14.69 / 39 P1 0.5038 0.1122

(GeV)

Table pos = 10.38 mm

0 200 400 600 800 1000

1200

1400

1600

0 10 20 30 40 50 60

ID Entries Mean RMS

100 17646 44.02 14.34

cypos(1) (mm)

Table pos = 10.38 mm

0 2 4 6 8 10 12 14 16 18

0 10 20 30 40 50 60

ID Entries Mean RMS

102 20731 29.61 16.93

Table pos = 10.38 mm

0 100 200 300 400 500 600 700 800 900

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 22505 9.402 4.203

eud (GeV)

Table pos = 10.38 mm

0 2 4 6 8 10 12 14

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 28462 11.51 4.677 12.17 / 38 P1 0.5011 0.1134

(GeV)

Table pos = 7.38 mm

0 200 400 600 800 1000

1200

1400

0 10 20 30 40 50 60

ID Entries Mean RMS

100 17597 42.09 13.78

cypos(1) (mm)

Table pos = 7.38 mm

0 2.5 5 7.5 10 12.5 15 17.5 20

0 10 20 30 40 50 60

ID Entries Mean RMS

102 20434 28.75 17.17

Table pos = 7.38 mm

0 100 200 300 400 500 600 700 800 900

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 22565 9.312 4.194

eud (GeV)

Table pos = 7.38 mm

0 2 4 6 8 10 12 14

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 28009 11.54 4.971 10.77 / 35 P1 0.6455 0.1339

(GeV)

Table pos = 4.38 mm

0 200 400 600 800 1000

1200

1400

0 10 20 30 40 50 60

ID Entries Mean RMS

100 16860 40.11 13.49

cypos(1) (mm)

Table pos = 4.38 mm

0 2 4 6 8 10 12 14

0 10 20 30 40 50 60

ID Entries Mean RMS

102 19634 28.57 17.13

Table pos = 4.38 mm

0 100 200 300 400 500 600 700 800 900

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 21659 9.249 4.149

eud (GeV)

Table pos = 4.38 mm

0 2 4 6 8 10 12 14 16 18

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 27185 11.25 4.685 7.662 / 34 P1 0.5681 0.1274

(GeV)

Table pos = 1.38 mm

0 200 400 600 800 1000

1200

1400

0 10 20 30 40 50 60

ID Entries Mean RMS

100 16956 38.11 13.07

cypos(1) (mm)

Table pos = 1.38 mm

0 2.5 5 7.5 10 12.5 15 17.5 20 22.5

0 10 20 30 40 50 60

ID Entries Mean RMS

102 19720 28.01 17.12

Table pos = 1.38 mm

0 100 200 300 400 500 600 700 800 900

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 21831 9.194 4.120

eud (GeV)

Table pos = 1.38 mm

0 2 4 6 8 10 12 14

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 27233 11.15 4.605 8.558 / 35 P1 0.5682 0.1256

(GeV)

Table pos = -1.62 mm

0 200 400 600 800 1000

1200

1400

0 10 20 30 40 50 60

ID Entries Mean RMS

100 17095 36.03 12.88

cypos(1) (mm)

Table pos = -1.62 mm

0 2.5 5 7.5 10 12.5 15 17.5 20 22.5

0 10 20 30 40 50 60

ID Entries Mean RMS

102 19632 27.78 17.69

Table pos = -1.62 mm

0 100 200 300 400 500 600 700 800 900

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 22045 9.185 4.136

eud (GeV)

Table pos = -1.62 mm

0 2 4 6 8 10 12 14 16

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 27042 11.22 4.496 8.104 / 34 P1 0.6314 0.1343

(GeV)

Table pos = -4.62 mm

0 200 400 600 800 1000

1200

1400

1600

0 10 20 30 40 50 60

ID Entries Mean RMS

100 16777 33.82 12.68

cypos(1) (mm)

Table pos = -4.62 mm

0 2 4 6 8 10 12 14

0 10 20 30 40 50 60

ID Entries Mean RMS

102 19515 28.12 17.64

Table pos = -4.62 mm

0 100 200 300 400 500 600 700 800 900

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 21648 9.153 4.134

eud (GeV)

Table pos = -4.62 mm

0 2 4 6 8 10 12 14 16

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 26896 11.46 4.936 4.876 / 36 P1 0.6821 0.1358

(GeV)

Table pos = -7.62 mm

0 200 400 600 800 1000

1200

0 10 20 30 40 50 60

ID Entries Mean RMS

100 15489 31.90 12.69

cypos(1) (mm)

Table pos = -7.62 mm

0

2

4

6

8

10

0 10 20 30 40 50 60

ID Entries Mean RMS

102 18876 29.57 17.63

Table pos = -7.62 mm

0 100 200 300 400 500 600 700 800

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 20070 8.997 4.049

eud (GeV)

Table pos = -7.62 mm

0 2 4 6 8 10

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 26757 11.07 4.848 2.908 / 36 P1 0.4232 0.1069

(GeV)

Table pos = -10.62 mm

0 200 400 600 800 1000

1200

1400

0 10 20 30 40 50 60

ID Entries Mean RMS

100 16344 29.57 12.28

cypos(1) (mm)

Table pos = -10.62 mm

0 2 4 6 8 10 12

0 10 20 30 40 50 60

ID Entries Mean RMS

102 19157 28.71 17.57

Table pos = -10.62 mm

0 100 200 300 400 500 600 700 800 900

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 21219 9.027 4.097

eud (GeV)

Table pos = -10.62 mm

0 2 4 6 8 10 12

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 26671 11.16 4.887 3.796 / 36 P1 0.5829 0.1255

(GeV)

Table pos = -13.62 mm

0 200 400 600 800 1000

1200

1400

0 10 20 30 40 50 60

ID Entries Mean RMS

100 16674 27.43 12.21

cypos(1) (mm)

Table pos = -13.62 mm

0 2 4 6 8 10 12 14 16

0 10 20 30 40 50 60

ID Entries Mean RMS

102 19388 29.62 18.09

Table pos = -13.62 mm

0 100 200 300 400 500 600 700 800 900

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 21619 9.065 4.099

eud (GeV)

Table pos = -13.62 mm

0 2 4 6 8 10 12 14

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 26837 11.39 5.051 6.282 / 36 P1 0.6329 0.1308

(GeV)

Table pos = -16.62 mm

0 200 400 600 800 1000

1200

1400

0 10 20 30 40 50 60

ID Entries Mean RMS

100 16761 25.36 12.29

cypos(1) (mm)

Table pos = -16.62 mm

0 2.5 5 7.5 10 12.5 15 17.5 20 22.5

0 10 20 30 40 50 60

ID Entries Mean RMS

102 19272 30.95 18.92

Table pos = -16.62 mm

0 100 200 300 400 500 600 700 800 900

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 21702 9.088 4.085

eud (GeV)

Table pos = -16.62 mm

0 2 4 6 8 10 12 14 16

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 26601 11.24 4.702 5.610 / 35 P1 0.6371 0.1330

(GeV)

Table pos = -19.62 mm

0 200 400 600 800 1000

1200

1400

0 10 20 30 40 50 60

ID Entries Mean RMS

100 16691 23.34 12.42

cypos(1) (mm)

Table pos = -19.62 mm

0 2 4 6 8 10 12 14 16

0 10 20 30 40 50 60

ID Entries Mean RMS

102 19349 29.90 18.47

Table pos = -19.62 mm

0 100 200 300 400 500 600 700 800 900

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 21667 9.106 4.099

eud (GeV)

Table pos = -19.62 mm

0 2 4 6 8 10 12

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 26922 11.15 4.609 8.062 / 34 P1 0.4993 0.1194

(GeV)

Table pos = -22.62 mm

0 200 400 600 800 1000

1200

1400

0 10 20 30 40 50 60

ID Entries Mean RMS

100 17020 21.19 12.49

cypos(1) (mm)

Table pos = -22.62 mm

0 2.5 5 7.5 10 12.5 15 17.5 20 22.5

0 10 20 30 40 50 60

ID Entries Mean RMS

102 19659 32.66 19.19

Table pos = -22.62 mm

0 100 200 300 400 500 600 700 800 900

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 21974 9.070 4.035

eud (GeV)

Table pos = -22.62 mm

0 2 4 6 8 10 12

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 27085 10.78 4.697 6.482 / 32 P1 0.5676 0.1311

(GeV)

Table pos = -25.62 mm

0 200 400 600 800 1000

1200

1400

0 10 20 30 40 50 60

ID Entries Mean RMS

100 17423 19.08 12.84

cypos(1) (mm)

Table pos = -25.62 mm

0 5 10 15 20 25

0 10 20 30 40 50 60

ID Entries Mean RMS

102 20032 31.52 18.22

Table pos = -25.62 mm

0 100 200 300 400 500 600 700 800 900

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 22406 9.235 4.096

eud (GeV)

Table pos = -25.62 mm

0 2 4 6 8 10 12 14 16

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 27528 11.23 4.307 10.09 / 31 P1 0.5791 0.1345

(GeV)

Table pos = -28.62 mm

0 200 400 600 800 1000

1200

1400

0 10 20 30 40 50 60

ID Entries Mean RMS

100 17698 17.22 13.11

cypos(1) (mm)

Table pos = -28.62 mm

0

10

20

30

40

50

0 10 20 30 40 50 60

ID Entries Mean RMS

102 20320 32.09 18.71

Table pos = -28.62 mm

0 100 200 300 400 500 600 700 800 900

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 22540 9.257 4.101

eud (GeV)

Table pos = -28.62 mm

0 2 4 6 8 10 12 14 16

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 27723 11.45 4.814 12.76 / 33 P1 0.6460 0.1378

(GeV)

Table pos = -31.62 mm

0 200 400 600 800 1000

1200

1400

0 10 20 30 40 50 60

ID Entries Mean RMS

100 18104 15.70 13.55

cypos(1) (mm)

Table pos = -31.62 mm

0 5 10 15 20 25 30 35 40

0 10 20 30 40 50 60

ID Entries Mean RMS

102 20823 33.13 18.06

Table pos = -31.62 mm

0 100 200 300 400 500 600 700 800 900

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 22972 9.511 4.200

eud (GeV)

Table pos = -31.62 mm

0 2 4 6 8 10 12 14

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 28307 11.58 4.462 19.29 / 31 P1 0.6693 0.1446

(GeV)

Table pos = -34.62 mm

0 200 400 600 800 1000

1200

0 10 20 30 40 50 60

ID Entries Mean RMS

100 18288 14.54 14.12

cypos(1) (mm)

Table pos = -34.62 mm

0 2 4 6 8 10 12 14 16

0 10 20 30 40 50 60

ID Entries Mean RMS

102 21103 31.71 18.04

Table pos = -34.62 mm

0 100 200 300 400 500 600 700 800

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 24109 10.59 4.577

eud (GeV)

Table pos = -34.62 mm

0 2 4 6 8 10 12 14 16

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 29598 13.06 4.830 75.05 / 40 P1 0.7799 0.1379

(GeV)

Table pos = -37.62 mm

0 200 400 600 800 1000

1200

1400

0 10 20 30 40 50 60

ID Entries Mean RMS

100 9430 13.53 14.63

cypos(1) (mm)

Table pos = -37.62 mm

0 2.5 5 7.5 10 12.5 15 17.5 20

0 10 20 30 40 50 60

ID Entries Mean RMS

102 11869 34.69 18.43

Table pos = -37.62 mm

0 100 200 300 400 500 600 700

0 5 10 15 20 25 30 35

ID Entries Mean RMS

100 14384 9.426 5.311

eud (GeV)

Table pos = -37.62 mm

0 1 2 3 4 5 6

0 5 10 15 20 25 30 35

ID Entries Mean RMS

102 19313 12.86 6.791 16.87 / 41 P1 0.9948 0.1539

(GeV)

Table pos = 22.38 mm

0 1000

2000

3000

4000

5000

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 9585 -0.9963 0.1846E-01

Table pos = 22.38 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 9585 0.00 0.00 0.00 0.00 0.958E+04 0.00 0.00 0.00 0.00

Table pos = 19.38 mm

0 2000

4000

6000

8000

10000

12000

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 19838 -0.9946 0.1827E-01

Table pos = 19.38 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 19838 0.00 0.00 0.00 1.00 0.198E+05 0.00 0.00 0.00 0.00

Table pos = 16.38 mm

0

2000

4000

6000

8000

10000

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 19965 -0.9880 0.2128E-01

Table pos = 16.38 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 19965 0.00 0.00 0.00 0.00 0.200E+05 0.00 0.00 0.00 0.00

Table pos = 13.38 mm

0 1000

2000

3000

4000

5000

6000

7000

8000

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 21439 -0.9793 0.2399E-01

Table pos = 13.38 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 21439 0.00 0.00 0.00 1.00 0.214E+05 0.00 0.00 0.00 0.00

Table pos = 10.38 mm

0 1000

2000

3000

4000

5000

6000

7000

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 20731 -0.9687 0.2946E-01

Table pos = 10.38 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 20731 0.00 0.00 0.00 0.00 0.207E+05 0.00 0.00 0.00 0.00

Table pos = 7.38 mm

0 1000

2000

3000

4000

5000

6000

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 20434 -0.9500 0.4059E-01

Table pos = 7.38 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 20434 0.00 0.00 0.00 0.00 0.204E+05 0.00 0.00 0.00 0.00

Table pos = 4.38 mm

0 500 1000

1500

2000

2500

3000

3500

4000

4500

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 19634 -0.9239 0.5120E-01

Table pos = 4.38 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 19634 0.00 0.00 0.00 0.00 0.196E+05 0.00 0.00 0.00 0.00

Table pos = 1.38 mm

0 500 1000

1500

2000

2500

3000

3500

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 19720 -0.8792 0.8566E-01

Table pos = 1.38 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 19720 0.00 0.00 0.00 0.00 0.197E+05 0.00 0.00 0.00 0.00

Table pos = -1.62 mm

0 250 500 750 1000

1250

1500

1750

2000

2250

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 19632 -0.7991 0.1129

Table pos = -1.62 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 19632 0.00 0.00 0.00 0.00 0.196E+05 0.00 0.00 0.00 0.00

Table pos = -4.62 mm

0 200 400 600 800 1000

1200

1400

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 19515 -0.6247 0.1853

Table pos = -4.62 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 19515 0.00 0.00 0.00 0.00 0.195E+05 0.00 0.00 0.00 0.00

Table pos = -7.62 mm

0 50 100 150 200 250 300 350 400

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 18876 -0.8827E-01 0.4109

Table pos = -7.62 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 18876 0.00 0.00 0.00 0.00 0.189E+05 0.00 0.00 0.00 0.00

Table pos = -10.62 mm

0 200 400 600 800 1000

1200

1400

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 19157 0.4650 0.4122

Table pos = -10.62 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 19157 0.00 0.00 0.00 0.00 0.192E+05 0.00 0.00 0.00 0.00

Table pos = -13.62 mm

0 250 500 750 1000

1250

1500

1750

2000

2250

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 19388 0.6789 0.3625

Table pos = -13.62 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 19388 0.00 0.00 0.00 0.00 0.194E+05 0.00 0.00 0.00 0.00

Table pos = -16.62 mm

0 500 1000

1500

2000

2500

3000

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 19272 0.8020 0.2783

Table pos = -16.62 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 19272 0.00 0.00 0.00 0.00 0.193E+05 0.00 0.00 0.00 0.00

Table pos = -19.62 mm

0 500 1000

1500

2000

2500

3000

3500

4000

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 19349 0.8667 0.2363

Table pos = -19.62 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 19349 0.00 0.00 0.00 0.00 0.193E+05 0.00 0.00 0.00 0.00

Table pos = -22.62 mm

0 1000

2000

3000

4000

5000

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 19659 0.9111 0.1933

Table pos = -22.62 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 19659 0.00 0.00 0.00 0.00 0.197E+05 0.00 0.00 0.00 0.00

Table pos = -25.62 mm

0 1000

2000

3000

4000

5000

6000

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 20032 0.9393 0.1563

Table pos = -25.62 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 20032 0.00 0.00 0.00 0.00 0.200E+05 0.00 0.00 0.00 0.00

Table pos = -28.62 mm

0 1000

2000

3000

4000

5000

6000

7000

8000

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 20320 0.9570 0.1312

Table pos = -28.62 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 20320 0.00 0.00 0.00 0.00 0.203E+05 0.00 0.00 0.00 0.00

Table pos = -31.62 mm

0 1000

2000

3000

4000

5000

6000

7000

8000

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 20823 0.9691 0.1130

Table pos = -31.62 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 20823 0.00 0.00 0.00 0.00 0.208E+05 0.00 0.00 0.00 0.00

Table pos = -34.62 mm

0 2000

4000

6000

8000

10000

12000

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 21103 0.9802 0.8161E-01

Table pos = -34.62 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 21103 0.00 0.00 0.00 0.00 0.211E+05 0.00 0.00 0.00 0.00

Table pos = -37.62 mm

0 1000

2000

3000

4000

5000

6000

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID Entries Mean RMS

100 11869 0.9738 0.9300E-01

Table pos = -37.62 mm

0 10 20 30 40 50 60

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1

ID 200 ENTRIES 11869 0.00 0.00 0.00 0.00 0.119E+05 0.00 0.00 0.00 0.00