ηΔ 2.5 3 3.5 4

(nb) ηΔ / d σd

0 1 2 3 4_{ZEUS (prel.) 1996-97}

HERWIG HERWIG + BFKL x 1.45 PYTHIA x 426 γ PYTHIA + high-t

ηΔ 2.5 3 3.5 4

(nb) ηΔ / d σd

0 0.1 0.2 0.3 0.4 < 1.0 GeV GAP TE

ηΔ 2.5 3 3.5 4

)ηΔf(

0 0.02

0.04

0.06

0.08 0.1

ZEUS