ZEUS

-0.4

-0.2 0 0.2 0.4

10 20 30 40

jet energy scale uncertainty

ZEUS (prel.) 98-00

E^{jet}_{T,B} (GeV)

(data-NLO)/NLO

-0.4

-0.2 0 0.2 0.4

10 20 30 40

NLO uncertainty

NLO (μ_R=Q)

E^{jet}_{T,B} (GeV)

(data-NLO)/NLO

-0.4

-0.2 0 0.2 0.4

10 20 30 40

-2 Λ η_B^{jet} Λ 1.5

E^{jet}_{T,B} (GeV)

(data-NLO)/NLO

-0.4

-0.2 0 0.2 0.4

10 20 30 40

|cos γ_h| Λ 0.65

E^{jet}_{T,B} (GeV)

(data-NLO)/NLO

-0.4

-0.2 0 0.2 0.4

10 20 30 40

E^{jet}_{T,B} (GeV)

(data-NLO)/NLO

-0.4

-0.2 0 0.2 0.4

10 20 30 40 E^{jet}_{T,B} (GeV)

(data-NLO)/NLO