ZEUS

0

2

4

6

8

10

12

14

16

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

x_L b (GeV^{-2})

ZEUS (prel.) 2000 Q^2 > 2 GeV^2 P_T^2 < 0.476 x_L^2 GeV^2 Systematic uncertainty