ZEUS

1

10

10^2

20 40 60 80 100 120 140 160 180 200 W (GeV) σ(γp5J/ψY)(nb) x 2 |t| (GeV^2) 1-2 2-5 5-10

10-20 δ 0.65Α0.08 0.95Α0.09

1.30Α0.19

0.98Α0.45

ZEUS (prel.) 96-00 fit A*x^δ