ZEUS

P_T(D^*)(GeV) dσ/dP_T(D^*) (nb/GeV)

ZEUS (prel.) 98-00 (78.6 pb^{-1})

0.001 Λ x_{IP} Λ 0.035 RAPGAP(H1FIT2 LO) 0.37 BGF+RES RES

10^{-2}

10^{-1}

1

1 2 3 4 5 6 7 8 9 10